DlgNewOrOpenFrame.Win.FontFace=Arial Cyr
DlgNewOrOpenFrame.Com.FontSize=12
DlgNewOrOpenFrame.Com.FontStyle=Normal
DlgNewOrOpenFrame.Com.FontColor=0000000

PaperSettingDlg.Win.FontFace=Arial Cyr
PaperSettingDlg.Com.FontSize=12
PaperSettingDlg.Com.FontStyle=Normal
PaperSettingDlg.Com.FontColor=0000000

PaperSettingForOpenDlg.Win.FontFace=Arial Cyr
PaperSettingForOpenDlg.Com.FontSize=12
PaperSettingForOpenDlg.Com.FontStyle=Normal
PaperSettingForOpenDlg.Com.FontColor=0000000

PaperSettingNewOrOpenDlg.Win.FontFace=Arial Cyr
PaperSettingNewOrOpenDlg.Com.FontSize=12
PaperSettingNewOrOpenDlg.Com.FontStyle=Normal
PaperSettingNewOrOpenDlg.Com.FontColor=0000000

PIFDesigner.Win.FontFace=Arial Cyr
PIFDesigner.Com.FontSize=12
PIFDesigner.Com.FontStyle=Normal
PIFDesigner.Com.FontColor=0000000

PIFDesigner.ToolBoxBar.Win.FontFace=Arial Cyr
PIFDesigner.ToolBoxBar.Com.FontSize=12
PIFDesigner.ToolBoxBar.Com.FontStyle=Normal
PIFDesigner.ToolBoxBar.Com.FontColor=0000000

PIFDesigner.ToolBoxBar.PaperInfoView.Win.FontFace=Arial Cyr
PIFDesigner.ToolBoxBar.PaperInfoView.Com.FontSize=12
PIFDesigner.ToolBoxBar.PaperInfoView.Com.FontStyle=Normal
PIFDesigner.ToolBoxBar.PaperInfoView.Com.FontColor=0000000

PIFDesigner.ToolBoxBar.PositionInfoView.Win.FontFace=Arial Cyr
PIFDesigner.ToolBoxBar.PositionInfoView.Com.FontSize=12
PIFDesigner.ToolBoxBar.PositionInfoView.Com.FontStyle=Normal
PIFDesigner.ToolBoxBar.PositionInfoView.Com.FontColor=000000

PIFDesigner.ToolBoxBar.CboPrintableArea.Win.FontFace=Arial Cyr
PIFDesigner.ToolBoxBar.CboPrintableArea.Com.FontSize=12
PIFDesigner.ToolBoxBar.CboPrintableArea.Com.FontStyle=Normal
PIFDesigner.ToolBoxBar.CboPrintableArea.Com.FontColor=000000

PIFDesigner.ToolBoxBar.StcUnitLabel.Win.FontFace=Arial Cyr
PIFDesigner.ToolBoxBar.StcUnitLabel.Com.FontSize= 12
PIFDesigner.ToolBoxBar.StcUnitLabel.Com.FontStyle=Normal
PIFDesigner.ToolBoxBar.StcUnitLabel.Com.FontColor=0000000

DlgPictureFrame.Win.FontFace=Arial Cyr
DlgPictureFrame.Com.FontSize=12
DlgPictureFrame.Com.FontStyle=Normal
DlgPictureFrame.Com.FontColor=0000000

DlgPictureFrame.TabPlace.Win.FontFace=Arial Cyr
DlgPictureFrame.TabPlace.Com.FontSize=12
DlgPictureFrame.TabPlace.Com.FontStyle=Normal
DlgPictureFrame.TabPlace.Com.FontColor=0000000

DlgPictureFrame.PnlPlace.Win.FontFace=Arial Cyr
DlgPictureFrame.PnlPlace.Com.FontSize=12
DlgPictureFrame.PnlPlace.Com.FontStyle=Normal
DlgPictureFrame.PnlPlace.Com.FontColor=0000000

DlgPictureFrame.PnlImgNfo.Win.FontFace=Arial Cyr
DlgPictureFrame.PnlImgNfo.Com.FontSize=12
DlgPictureFrame.PnlImgNfo.Com.FontStyle=Normal
DlgPictureFrame.PnlImgNfo.Com.FontColor=0000000

DlgAlphaBlend.Win.FontFace=Arial Cyr
DlgAlphaBlend.Com.FontSize=12
DlgAlphaBlend.Com.FontStyle=Normal
DlgAlphaBlend.Com.FontColor=0000000

DlgStringEdit.Win.FontFace=Arial Cyr
DlgStringEdit.Com.FontSize=12
DlgStringEdit.Com.FontStyle=Normal
DlgStringEdit.Com.FontColor=0000000

DlgFigureSetting.Win.FontFace=Arial Cyr
DlgFigureSetting.Com.FontSize=12
DlgFigureSetting.Com.FontStyle=Normal
DlgFigureSetting.Com.FontColor=0000000

DlgBackgroundSetting.Win.FontFace=Arial Cyr
DlgBackgroundSetting.Com.FontSize=12
DlgBackgroundSetting.Com.FontStyle=Normal
DlgBackgroundSetting.Com.FontColor=0000000

DlgFrameInfo.Win.FontFace=Arial Cyr
DlgFrameInfo.Com.FontSize=12
DlgFrameInfo.Com.FontStyle=Normal
DlgFrameInfo.Com.FontColor=0000000

DlgSelectImage.Win.FontFace=Arial Cyr
DlgSelectImage.Com.FontSize=12
DlgSelectImage.Com.FontStyle=Normal
DlgSelectImage.Com.FontColor=0000000

DlgRollPaperSetting.Win.FontFace=Arial Cyr
DlgRollPaperSetting.Com.FontSize=12
DlgRollPaperSetting.Com.FontStyle=Normal
DlgRollPaperSetting.Com.FontColor=0000000

DlgGridSetting.Win.FontFace=Arial Cyr
DlgGridSetting.Com.FontSize=12
DlgGridSetting.Com.FontStyle=Normal
DlgGridSetting.Com.FontColor=0000000

DlgEnvironment.Win.FontFace=Arial Cyr
DlgEnvironment.Com.FontSize=12
DlgEnvironment.Com.FontStyle=Normal
DlgEnvironment.Com.FontColor=0000000

ConfirmSaveDlg.Win.FontFace=Arial Cyr
ConfirmSaveDlg.Com.FontSize=12
ConfirmSaveDlg.Com.FontStyle=Normal
ConfirmSaveDlg.Com.FontColor=0000000

ConfirmShowUACDlg.Win.FontFace=Arial Cyr
ConfirmShowUACDlg.Com.FontSize=12
ConfirmShowUACDlg.Com.FontStyle=Normal
ConfirmShowUACDlg.Com.FontColor=0000000

DlgRegisterDialog.Win.FontFace=Arial Cyr
DlgRegisterDialog.Com.FontSize=12
DlgRegisterDialog.Com.FontStyle=Normal
DlgRegisterDialog.Com.FontColor=0000000


DlgInputPackageName.Win.FontFace=Arial Cyr
DlgInputPackageName.Com.FontSize=12
DlgInputPackageName.Com.FontStyle=Normal
DlgInputPackageName.Com.FontColor=0000000