PnlRegist.Win.FontFace=MS P Gothic
PnlRegist.Win.FontSize=12
PnlRegist.Win.FontStyle=Normal

PnlMove.Win.FontFace=MS P Gothic
PnlMove.Win.FontSize=12
PnlMove.Win.FontStyle=Normal

PnlMoveTo.Win.FontFace=MS P Gothic
PnlMoveTo.Win.FontSize=12
PnlMoveTo.Win.FontStyle=Normal

PnlConfirmDelete.Win.FontFace=MS P Gothic
PnlConfirmDelete.Win.FontSize=12
PnlConfirmDelete.Win.FontStyle=Normal

PnlConfirmShowUAC.Win.FontFace=MS P Gothic
PnlConfirmShowUAC.Win.FontSize=12
PnlConfirmShowUAC.Win.FontStyle=Normal

PnlName.Win.FontFace=MS P Gothic
PnlName.Win.FontSize=12
PnlName.Win.FontStyle=Normal

PnlSetting.Win.FontFace=MS P Gothic
PnlSetting.Win.FontSize=12
PnlSetting.Win.FontStyle=Normal

PnlInformation.Win.FontFace=MS P Gothic
PnlInformation.Win.FontSize=12
PnlInformation.Win.FontStyle=Normal

PnlProgress.Win.FontFace=MS P Gothic
PnlProgress.Win.FontSize=12
PnlProgress.Win.FontStyle=Normal

PnlAccount.Win.FontFace=MS P Gothic
PnlAccount.Win.FontSize=12
PnlAccount.Win.FontStyle=Normal

PnlServerInfo.Win.FontFace=MS P Gothic
PnlServerInfo.Win.FontSize=12
PnlServerInfo.Win.FontStyle=Normal